686664626058565452

Declination (deg)

195190185180175170165Right Ascension (deg)

GRB 970603

BACODINE

Rapid Burst Response

BATSE/UlyssesScanned by RXTE—PCA ¥ ~3 hr after burst!¥ No sources detected.¥ < few mCrab.