656055504540

Declination (deg; J2000)

210200190180170Right Ascension (deg; J2000)

GRB 971227

BATSE

BeppoSAX WFCR.M. Kippen UAH/MSFC 1997

59.859.659.459.259.058.8195.5

195.0

194.5

194.0

193.5

SAX WFC

SAX NFI 1

SAX NFI 2