-70-65-60-55-50-45

Declination (deg; J2000)

3020100-10Right Ascension (deg; J2000)

GRB 980109

BATSE RBR (50%, 68%, 90%)

BeppoSAX WFCR.M. Kippen UAH/MSFC 1997