9085807570

Declination (deg; J2000)

320300280260240220Right Ascension (deg; J2000)

GRB 980124

BATSE 50%, 68%, 90%

COMPTEL 1,2,3s

BATSE/Ulysses IPNR.M. Kippen UAH/MSFC 1998