55504540353025

Declination (deg; J2000)

13012011010090Right Ascension (deg; J2000)

GRB 980329

BATSE RBR 50%, 68%, 90%

COMPTEL 1,2,3s

BATSE/Ulysses IPNR.M. Kippen UAH/MSFC 1998

39.139.038.938.838.738.6106.0

105.8

105.6

105.4

SAX-WFC

SAX-NFI

BATSE/Ulysses IPN