-65-60-55-50-45-40

Declination (deg; J2000)

310300290280270Right Ascension (deg; J2000)

GRB 980425

BATSE 50%, 68%, 90%R.M. Kippen UAH/MSFC 1998

-53.2

-53.0

-52.8

-52.6

294.2

294.0

293.8

293.6

293.4

293.2

SAX-WFC

SAX-NFI

Optical Transient