55504540

Declination (deg; J2000)

245240235230225220215Right Ascension (deg; J2000)

GRB 990123

BATSE-RBR (50%, 68%, 90%)

COMPTEL (1s,2s,3s)

SAX/Ulysses IPNR.M. Kippen UAH/MSFC 1999

44.90

44.85

44.80

44.75

44.70

44.65

44.60

231.5

231.4

231.3

231.2

SAX-WFC

SAX-NFI

SAX/Ulysses IPN

Optical transient