-80-75-70-65-60

Declination (deg; J2000)

11010090807060Right Ascension (deg; J2000)

GRB 990424A

BATSE-RBR 50%, 68%, 90%

BATSE/Ulysses IPNR.M. Kippen UAH/MSFC 1999