-90-85-80-75-70

Declination (deg; J2000)

260240220200180160Right Ascension (deg; J2000)

GRB 990510

BATSE-RBR 50%, 68%, 90%

BATSE/Ulysses IPNR.M. Kippen UAH/MSFC 1999

-80.60

-80.55

-80.50

-80.45

-80.40

205.2

204.8

204.4

204.0

SAX-WFC

SAX-NFI

Optical Transient