-90-85-80-75-70-65-60

Declination (deg; J2000)

100806040200-20Right Ascension (deg; J2000)

GRB 990806

BATSE 50%, 68%, 90%R.M. Kippen UAH/MSFC 1999

-68.20

-68.15

-68.10

-68.05

-68.00

47.947.847.747.647.547.447.3 SAX-WFC

SAX-NFI